QORG WGA field shifts -- field shifts bounded by blue (high wgt) accepted, bounded by orange (low wgt) not used.

Sum of _FREQ_ offset wgt 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48 49 50 51 52 53 54 55 56 57 59 Grand Total 1 1 3 2 1 4 1 1 4 1 2 3 2 1 1 2 2 2 1 1 1 2 1 1 1 1 1 1 1 1 1 1 1 1 1 1 1 53 1.1 3 1 3 5 3 2 2 1 4 2 4 1 1 3 1 4 2 2 2 1 5 1 1 2 1 3 1 3 3 1 1 2 2 1 2 2 1 2 1 1 83 1.2 2 2 1 3 6 5 5 5 2 6 1 1 2 3 3 1 3 1 2 1 1 1 2 1 3 4 4 2 3 2 1 3 1 2 1 2 2 1 1 1 2 2 2 1 100 1.3 1 3 1 7 2 5 5 6 6 4 2 3 1 1 6 1 1 3 1 3 4 2 1 2 2 2 6 2 1 1 1 2 1 2 1 1 1 3 1 2 1 2 2 1 1 1 1 1 110 1.4 1 3 3 6 7 13 7 7 5 4 4 5 4 3 6 1 3 4 2 1 2 2 4 2 4 2 1 1 1 1 2 1 1 1 1 1 1 117 1.5 2 3 5 4 9 4 4 5 2 7 2 2 2 3 3 1 2 2 1 2 1 1 1 1 1 1 1 72 1.6 1 1 4 2 3 2 2 1 3 5 1 1 2 2 2 1 3 1 1 1 1 1 1 42 1.7 1 3 6 5 3 4 3 6 3 2 2 2 1 1 1 1 2 3 1 1 2 1 1 1 1 1 1 59 1.8 1 2 1 4 3 4 2 2 1 1 1 1 1 1 1 1 1 28 1.9 1 3 6 3 3 2 4 1 1 1 1 1 1 1 1 1 31 2 3 2 4 2 2 1 3 2 1 3 1 2 2 2 1 1 1 1 1 35 2.1 1 2 4 3 3 3 3 5 5 2 4 4 2 2 1 3 1 48 2.2 2 1 4 1 8 2 1 5 2 4 1 2 1 1 1 1 37 2.3 2 3 1 5 5 2 3 4 3 2 2 2 1 1 1 1 38 2.4 6 5 2 3 5 5 5 5 3 2 1 2 1 1 46 2.5 2 1 3 3 2 5 3 2 3 1 2 1 2 1 1 1 33 2.6 1 3 2 2 1 6 7 5 3 1 3 1 3 1 1 3 43 2.7 2 1 1 3 4 2 2 2 4 1 9 2 2 1 2 1 1 1 41 2.8 2 11 1 2 2 4 2 1 4 3 1 2 3 1 1 1 1 42 2.9 2 1 4 4 4 1 4 4 2 4 5 2 2 2 1 1 43 3 2 2 4 3 3 3 3 2 2 1 3 1 2 31 3.1 4 2 3 2 1 5 2 2 5 5 3 1 1 1 37 3.2 1 2 7 2 3 5 2 1 4 2 2 3 1 1 1 1 38 3.3 2 4 2 2 3 2 4 3 1 2 1 2 5 1 1 35 3.4 1 5 1 1 3 3 4 4 3 1 1 1 1 1 1 31 3.5 2 1 3 1 1 2 2 6 2 1 3 1 1 1 1 28 3.6 1 1 2 3 1 5 2 1 5 3 4 3 1 2 1 35 3.7 1 1 2 1 4 1 2 3 1 1 17 3.8 1 3 3 2 4 1 3 1 2 4 1 25 3.9 4 2 2 2 1 1 2 3 3 2 3 1 1 27 4 1 6 3 2 3 1 2 1 1 1 2 3 1 27 4.1 1 3 1 3 2 3 1 1 1 2 2 3 1 1 25 4.2 1 1 1 2 3 2 1 2 2 2 1 1 1 2 1 23 4.3 1 2 1 2 3 3 2 1 2 1 1 1 20 4.4 1 3 1 1 2 1 4 2 2 17 4.5 3 2 1 5 1 1 4 2 2 1 2 2 1 1 28 4.6 1 1 2 3 4 1 2 2 3 3 2 24 4.7 3 1 3 4 1 3 3 1 2 1 2 24 4.8 2 1 1 1 2 1 2 1 2 2 1 2 1 19 4.9 1 3 2 2 3 3 3 1 2 1 1 22 5 1 1 1 2 1 2 2 1 1 1 2 2 17 5.1 1 1 1 1 2 2 2 1 11 5.2 1 1 2 2 1 3 3 3 1 2 1 2 1 1 24 5.3 1 4 2 1 3 1 1 7 1 21 5.4 1 1 2 1 1 1 7 5.5 1 3 1 1 1 1 1 3 2 1 15 5.6 2 2 1 1 1 2 1 1 1 12 5.7 2 1 1 1 1 1 2 1 2 1 1 14 5.8 1 2 1 3 1 1 1 10 5.9 2 2 1 1 1 4 1 1 1 14 6 1 2 1 1 1 1 2 1 1 1 12 6.1 1 1 2 1 1 1 1 1 1 10 6.2 2 2 2 1 2 9 6.3 1 1 2 1 1 1 1 1 9 6.4 2 1 1 1 1 1 2 1 1 1 12 6.5 2 1 1 1 1 1 7 6.6 1 2 2 1 1 7 6.7 1 2 2 2 1 1 1 2 12 6.8 1 2 2 1 1 1 1 9 6.9 1 1 1 3 2 1 2 2 2 15 7 2 1 1 2 1 2 1 10 7.1 1 2 1 1 5 7.2 1 1 2 1 1 1 1 8 7.3 2 3 2 1 1 9 7.4 1 1 1 1 1 5 7.5 1 1 1 3 7.6 1 2 1 1 1 1 7 7.7 1 1 1 1 4 7.8 1 1 1 2 1 6 7.9 1 1 1 3 8 1 1 1 1 1 1 6 8.1 1 1 8.2 1 2 2 1 1 7 8.3 1 1 1 3 8.4 1 1 1 1 4 8.5 1 1 2 8.6 1 1 1 3 8.7 1 1 1 1 1 5 8.8 1 1 1 1 4 8.9 1 1 2 9 1 1 1 1 4 9.1 2 1 1 4 9.2 1 1 2 9.3 1 1 2 9.4 1 1 1 3 9.5 1 1 1 3 9.6 3 3 9.7 1 1 1 1 4 9.8 1 1 1 3 9.9 1 1 1 3 10 1 1 2 10.1 1 1 10.2 1 1 2 10.3 1 1 1 3 10.4 1 1 1 3 10.5 1 1 10.6 1 1 2 10.7 1 1 2 10.8 1 1 2 10.9 1 1 11 1 1 11.3 1 1 1 1 4 11.4 1 1 11.5 1 1 1 1 1 1 6 11.6 1 1 2 11.8 1 1 11.9 1 2 3 12 1 1 12.2 1 1 1 3 12.4 1 1 1 3 12.5 1 2 3 12.6 1 1 12.8 1 1 2 13.2 3 3 13.4 1 1 2 13.6 1 1 13.7 1 1 14.3 1 1 14.5 1 1 14.8 1 1 14.9 1 1 15 1 1 2 15.8 1 1 16.1 1 1 16.6 1 1 16.8 1 1 18.4 1 1 18.6 1 1 19.6 1 1 20.9 1 1 21.1 1 1 2 21.6 1 1 29.4 1 1 34.2 1 1 77.2 2 2 Grand Total12 70 104 142 135 164 148 145 162 138 97 117 83 57 50 62 33 44 23 16 24 19 11 11 12 8 12 12 14 17 10 9 8 5 6 4 7 8 5 5 4 7 5 5 7 5 5 8 3 4 7 3 4 3 2 2 1 2 1 2087